1.6 1.7 1.8 1.9 2 2.1 2.2 2.3 0

1

2

3

4

5

6

7 x 10^4 Dmass

1.6 1.7 1.8 1.9 2 2.1 2.2 0

2000

4000

6000

8000

10000

12000

14000

Dmass

1.6 1.7 1.8 1.9 2 2.1 2.2 0

1000

2000

3000

4000

5000

6000

7000

DMass

1.6 1.7 1.8 1.9 2 2.1 2.2 0

500

1000

1500

2000

2500

3000

3500

4000

4500

5000

DMass, particles w/ ciso < .0001

1.6 1.7 1.8 1.9 2 2.1 2.2 0

500

1000

1500

2000

2500

3000

3500

4000

4500

DMass, cut on vz, vpz, kps, wobsk, alsig

0 1 2 3 4 5 6 7 0

1000

2000

3000

4000

5000

6000

7000

8000

9000

T, abs(dmass) - 1.872 < .02

0 1 2 3 4 5 6 7 0

1000

2000

3000

4000

5000

6000

7000

8000

9000

T, abs(dmass) - 1.822 < .02 or abs(dmass) - 1.922 < .02

0 1 2 3 4 5 6 7 0

200

400

600

800

1000

1200

1400

1600

1800

T, with sidebars removed

0 1 2 3 4 5 6 0

200

400

600

800

1000

1200

1400

1600

1800

T, with sidebars removed

0 1 2 3 4 5 6 7 0

200

400

600

800

1000

1200

1400

1600

1800

T, no sidebars, error bars