Light yields for 60 cm prototype and 2m expectations

20

30

40

50 60

0 20 40 60 80 100 120 140 160 180 200 cm

N_{p.e.} .

R=89%

l_2=246 cm

Expected lightyield for 2m sample

N_{p.e.} =21.6

60cm prototype with mirror ^{106}Ru 60cm prototype with black paper ^{106}Ru Y11 fiber