RAW BS-DS distribution

0

100

200

300

400

500

600

700

800

-60 -50 -40 -30 -20 -10 0

ID Entries 6 19999 355.7 / 113 P1 -43.28 0.3247E-01 P2 12.25 0.1225 P3 0.8940 0.2912E-01 P4 807.6 9.183 P5 1.402 0.3860

:1/09/11 03.25

BS - DS unpacked in RAW mode