illumition of different sectors

Illumination of detector with cosmic triggers

0

1000

2000

3000

4000

5000 x 10^2

2.5 5 7.5 10 12.5 15 17.5 20 22.5

:1/09/03 16.50

illumition of different layers 0 1000

2000

3000

4000

5000

6000 x 10^2

2 4 6 8 10 12 14 16 18