-0.2

0

0.2

0.4

0.6

0.8

1

1.2

0 20 40 60 80 100

Fe55 Pulse Shape at BNL-871 Disc. Input ArEth 1550 Volts T_{RISE}(10-90) = 6.98 nsec T_{FALL}(90-10) = 14.63 nsec V-nominal = 273 mV

TIME (nsec)

-4

-2

0

2

4

6

8

10

12

14

0 20 40 60 80 100 Time (nsec)

F(x)=8*(tanh((x-4.5)/3)+1)*(tanh(-(x-4.5)/10)+1)-.7*(tanh((x-30)/10)+1)*(tanh(-(x-30)/20)+1)