Sum Of Distance for top chamber (μm) 0 2.5 5 7.5 10 12.5 15 17.5

0 500 1000 1500 2000 2500 3000 3500 4000 4500 5000

Sum Of Distance for bottom chamber (μm) 0 5 10 15 20 25

0 500 1000 1500 2000 2500 3000 3500 4000 4500 5000