Charged Kaons at the Main Injector

June 6, 2002

A Proposal for a Precision Measurement of the Decay K^+ → π^+νν and Other Rare K^+ Processes at Fermilab Using the Main Injector

J. Frank, S. Kettell, R. Strand

Brookhaven National Laboratory, Upton, NY, USA

L. Bellantoni, R. Coleman, P.S. Cooper^∗, T. R. Kobilarcik, H. Nguyen, E. Ramberg, R. S. Tschirhart, H. B. White, J. Y. Wu

Fermi National Accelerator Laboratory, Batavia, IL, USA

G. Britvich, V. Burtovoy, A. V. Inyakin, V. Kurshetsov, A. Kushnirenko, L. G. Landsberg, V. Molchanov, V. Obraztsov, S. I. Petrenko, V. I. Rykalin, A. Soldatov, M. M. Shapkin, O. G. Tchikilev, D. Vavilov, O. Yushchenko

Institute of High Energy Physics, Serpukhov, Russia

V. Bolotov, S. Laptev, A. Polarush, A. Pastsiak, R. Sirodeev

Institute of Nuclear Research, Troisk, Russia

J. Engelfried, A. Morelos

Instituto de Fisica, Universidad Autonoma de San Luis Potosi, Mexico

A. R. Barker, H. Huang, R. Niclasen, M. Wilking

University of Colorado, Boulder, Colorado, 80309

M. Campbell, R. Gustafson, M. Longo, H. Park

University of Michigan, Ann Arbor, Michigan 48109

C.M. Jenkins

University of South Alabama, Mobile, Alabama 36688

K. Lang

University of Texas at Austin, Austin, Texas 78712

C. Dukes, L. Lu, K. Nelson

University of Virgina, Charlottesville, Virgina 22901

∗ Spokesman: P.S. Cooper, pcooper@fnal.gov, (630) 840-2629 Web Address: www.fnal.gov/projects/ckm/Welcome.html