OPERA-2d

Pre and Post-Processor 1.6

20/Jan/00 18:39:01 Page 9

UNITS Length :mm Flux density:T Field strength:A m^{-1} Potential :Wb m^{-1} Conductivity:S cm^{-1} Source density:A m^{-2} Power :W Force :N Energy :J Mass :kg

PROBLEM DATA dwg45_ssc_1136ka.st Quadratic elements XY symmetry Vector potential Magnetic fields Static solution Scale factor = 1.0 3731 elements 7658 nodes 24 regions

0.0 20.0 40.0 60.0 80.0 100.0 120.0 140.0 160.0 180.0 200.0 220.0 240 0.0

20.0

40.0

60.0

80.0

100.0

120.0

140.0

X [mm]

Y [mm]

-0.906711 2.709152 6.325015

Component: BX