Z=4360 Z=4660 Z=6010

Z=5010 Z=5410 Z=5760

(Dashed line = Photon Solid line = Electron)

Proposed Minimal Scheme for VVS and DMS Geometry

Principles dictating placement::

- Photons created at z=4360 must hit a photon veto - Electrons bent at middle of magnet must hit a photon veto - Last VVS is placed such that 103 cm radius CsIis 2300 cm downstream

= Vacuum Window

= Analysis Magnet

= VVS module

= DMS Chamber